0.0

0.5

1.0

1.5

Ca

Mo

O

0.0

0.5

1.0

Ca

W

O

0.0

0.5

1.0

Pb

Mo

O

-8 -6 -4 -2 0 2 4 6 8 10

E (eV)

0.0

0.5

1.0

Pb

W

O

Na(E) (states/eV/atom)

CaMoO

4

CaWO

4

PbMoO

4

PbWO

4