                                                                      -80 -70 -60 -50 -40 -30 -20 -10 0 10

E  (eV)

                                                                   0

                                                       10

                                                       20

                                                       30

                                                       40

CdWO

4

Cd 4
dO 2sCd 4
p1/2Cd 4
p3/2W 5
sW 5
p1/2W 5
p3/2W 4
f5/2W 4
f7/2O 2pW 5
dNT(E)((states/eV)/Unit cell )

                                                                   0

                                                       10

                                                       20

                                                       30

                                                       40

                                                       50

CdMoO

4
p1/2Mo 4
sCd 4
p3/2Mo 4
p3/2O 2sCd 4
dMo 4
dO 2p