                                                        3.4 3.5 3.6 3.7

a (Å)

                            -10.20

                            -10.15

                            -10.10

                            -10.05

                            -10.00

                                  -9.95

-Ecoh (eV)

Pseudo LAPW PAW

C (diamond)