                                                        4.2 4.3 4.4 4.5

a (Å)

                                  -16.9

                                  -16.8

                                  -16.7

                                  -16.6

                                  -16.5

                                  -16.4

-Ecoh (eV)

Pseudo LAPW PAW

SiC